### CLI options

- _-h_, _-?_, _/h_, _/?_ or _--help_ - displays help
- _--clean_ - cleans up files created by SVR.JS
- _--reset_ - resets SVR.JS to default settings (**WARNING: DANGEROUS**)
- _--secure_ - runs HTTPS server
- _--disable-mods_ - disables mods (safe mode)
- _--single-threaded_ - runs single-threaded
- _-v_ or _--version_ - displays server version
